%%
%% This is file `inputnormalization.tex',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% inputnormalization.dtx  (with options: `tex-package')
%% 
%% IMPORTANT NOTICE:
%% 
%% For the copyright see the source file.
%% 
%% Any modified versions of this file must be renamed
%% with new filenames distinct from inputnormalization.tex.
%% 
%% For distribution of the original source see the terms
%% for copying and modification in the file inputnormalization.dtx.
%% 
%% This generated file may be distributed as long as the
%% original source files, as listed above, are part of the
%% same distribution. (The sources need not necessarily be
%% in the same archive or directory.)
%% Copyright (C) 2020--2021 by Marcel Krueger
%%
%% This file may be distributed and/or modified under the
%% conditions of the LaTeX Project Public License, either
%% version 1.3 of this license or (at your option) any later
%% version. The latest version of this license is in:
%%
%% http://www.latex-project.org/lppl.txt
%%
%% and version 1.3 or later is part of all distributions of
%% LaTeX version 2005/12/01 or later.
\ifx\directlua\undefined
\ifx\XeTeXinputnormalization\undefined
  \begingroup
    \ifx\PackageError\undefined
      \def\PackageError#1#2#3{\errhelp{#3}\errmessage{#1: #2}}
    \fi
\PackageError{inputnormalization}{LuaTeX or XeTeX required}%
    {inputnormalization requires LuaTeX or XeTeX.
     Maybe you forgot to switch the engine in your editor?}
  \endgroup
\else
  \let\Uinputnormalization\XeTeXinputnormalization
\fi
\else
  \ifx\newluafunction\@undefined
    \input ltluatex
  \fi
  \newcount\Uinputnormalization
  \directlua{
    local getcount = tex.getcount
    local function ident(buf) return buf end
    local uni_normalize = require'lua-uni-normalize'
    local normalize = {[0] = ident, uni_normalize.NFC, uni_normalize.NFD}
    luatexbase.add_to_callback('process_input_buffer', function(buf)
      return normalize[getcount(\the\allocationnumber)](buf)
    end, 'inputnormalization')
  }
\fi
\Uinputnormalization=1
\endinput
%%
%% End of file `inputnormalization.tex'.
